Title: Demo Directory Structure
Course: Introduction to SSL/PKI > Section: Demos

Demo Directory Structure

Demo Directory Structure

The scripts or window batch files assume the following directory structure.

<ROOT> | The default directory where the scripts or window batch files are executed.
CA | Where the CA certificate, key and CSR (Certificate Signing Request) are created.
CERTS | Where the certificates are created.
KEYS | Where the keys are created.
REQUESTS | Where the CSRs (Certificate Signing Requests) are created.

The example commands, scripts, etc. assume the above directory structure. The default root directory is

- Windows: C:/SSL_CLASS
- Linux/Unix: ~/ssl_class

Note: You can modify this for your environment, but you must then modify the demo commands, etc.